\begin{tabular}{ll}
\toprule
Configuration & Raw Time \\
\midrule
DDR-SDRAM (Baseline) & 131.18 ms \\
HBM (Upper Limit) & 93.09 ms \\
\bottomrule
\end{tabular}
